X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/fe979f4143a71d7951dcfa35c9fdf68841742c74..59b24ea9a90ba60563316a5c2ad4c7ce8a8c423d:/src/components/breadcrumbs/breadcrumbs.test.tsx

diff --git a/src/components/breadcrumbs/breadcrumbs.test.tsx b/src/components/breadcrumbs/breadcrumbs.test.tsx
index ef3f888797..ea3d5ac21e 100644
--- a/src/components/breadcrumbs/breadcrumbs.test.tsx
+++ b/src/components/breadcrumbs/breadcrumbs.test.tsx
@@ -6,7 +6,7 @@ import * as React from "react";
 import { mount, configure } from "enzyme";
 
 import * as Adapter from "enzyme-adapter-react-16";
-import Breadcrumbs from "./breadcrumbs";
+import { Breadcrumbs } from "./breadcrumbs";
 import { Button } from "@material-ui/core";
 import ChevronRightIcon from '@material-ui/icons/ChevronRight';
 
@@ -50,4 +50,4 @@ describe("<Breadcrumbs />", () => {
     });
 
 
-});
\ No newline at end of file
+});
