X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/fd470d8f7838b57777492289e6e4195b6c39bd2e..a48138fa7227595bba0db267a4c37832cba9afa2:/src/views-components/details-panel/details-panel.tsx

diff --git a/src/views-components/details-panel/details-panel.tsx b/src/views-components/details-panel/details-panel.tsx
index 9ce84867d7..f4aaa8436f 100644
--- a/src/views-components/details-panel/details-panel.tsx
+++ b/src/views-components/details-panel/details-panel.tsx
@@ -56,7 +56,7 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
     },
     tabContainer: {
         overflow: 'auto',
-        padding: theme.spacing.unit * 3,
+        padding: theme.spacing.unit * 1,
     },
 });
 
