X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/f9dde5c781766b8be71d43d0f031c201a0edcfbb..02fe86a56f080ed1d5770ad6c6856a15f50ab508:/src/views-components/main-app-bar/admin-menu.tsx

diff --git a/src/views-components/main-app-bar/admin-menu.tsx b/src/views-components/main-app-bar/admin-menu.tsx
index 9b94c064ed..549ab7ce34 100644
--- a/src/views-components/main-app-bar/admin-menu.tsx
+++ b/src/views-components/main-app-bar/admin-menu.tsx
@@ -8,7 +8,6 @@ import { User } from "~/models/user";
 import { DropdownMenu } from "~/components/dropdown-menu/dropdown-menu";
 import { AdminMenuIcon } from "~/components/icon/icon";
 import { DispatchProp, connect } from 'react-redux';
-import { logout } from '~/store/auth/auth-action';
 import { RootState } from "~/store/store";
 import { openRepositoriesPanel } from "~/store/repositories/repositories-actions";
 import * as NavigationAction from '~/store/navigation/navigation-action';
