X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/f86952003527ad917fa3c9106a90a6075d8b2dde..0019db357afed7f52da38e9c398f3e39ce4eb162:/services/workbench2/src/components/multiselect-toolbar/ms-toolbar-overflow-menu.tsx?ds=sidebyside

diff --git a/services/workbench2/src/components/multiselect-toolbar/ms-toolbar-overflow-menu.tsx b/services/workbench2/src/components/multiselect-toolbar/ms-toolbar-overflow-menu.tsx
index a0ba5cee98..9f8ced940d 100644
--- a/services/workbench2/src/components/multiselect-toolbar/ms-toolbar-overflow-menu.tsx
+++ b/services/workbench2/src/components/multiselect-toolbar/ms-toolbar-overflow-menu.tsx
@@ -28,7 +28,7 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
         },
         marginTop: 0,
         paddingTop: 0,
-        paddingLeft: '0.85rem',
+        paddingLeft: '1rem',
         height: '2.5rem',
     },
     menuElement: {
