X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/f6f88d9ca9cdeeeebfadcfe999789bfb9f69e5c6:/src/views-components/repositories-sample-git-dialog/repositories-sample-git-dialog.tsx..2f83fcd45b4b23db2bb5bb4afbe1e863ebd77ec6:/services/workbench2/src/views-components/repositories-sample-git-dialog/repositories-sample-git-dialog.tsx

diff --git a/src/views-components/repositories-sample-git-dialog/repositories-sample-git-dialog.tsx b/services/workbench2/src/views-components/repositories-sample-git-dialog/repositories-sample-git-dialog.tsx
similarity index 100%
rename from src/views-components/repositories-sample-git-dialog/repositories-sample-git-dialog.tsx
rename to services/workbench2/src/views-components/repositories-sample-git-dialog/repositories-sample-git-dialog.tsx
