X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/f3b8d03f7063b162355bccfd71aeb2b8b67bbdbb..19c37b6272043711e64fa30b02d82dfa9aab3f19:/services/workbench2/src/components/multiselect-toolbar/MultiselectToolbar.tsx

diff --git a/services/workbench2/src/components/multiselect-toolbar/MultiselectToolbar.tsx b/services/workbench2/src/components/multiselect-toolbar/MultiselectToolbar.tsx
index 3d8ae0c3d3..4eff8885fc 100644
--- a/services/workbench2/src/components/multiselect-toolbar/MultiselectToolbar.tsx
+++ b/services/workbench2/src/components/multiselect-toolbar/MultiselectToolbar.tsx
@@ -26,6 +26,7 @@ type CssRules = "root" | "button";
 const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
     root: {
         display: "flex",
+        flexShrink: 0,
         flexDirection: "row",
         width: 0,
         padding: 0,
