X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/f0a64666816383d2641d5fa7ea22019441ac4464..f4d717705f9824add63e7d0730f486f58a93cf83:/src/index.tsx

diff --git a/src/index.tsx b/src/index.tsx
index aa372fa508..bf810fb758 100644
--- a/src/index.tsx
+++ b/src/index.tsx
@@ -8,7 +8,7 @@ import { Provider } from "react-redux";
 import { MainPanel } from '~/views/main-panel/main-panel';
 import '~/index.css';
 import { Route, Switch } from 'react-router';
-import createBrowserHistory from "history/createBrowserHistory";
+import { createBrowserHistory } from "history";
 import { History } from "history";
 import { configureStore, RootStore } from '~/store/store';
 import { ConnectedRouter } from "react-router-redux";
