X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/ee9d1e39b5d469a827be5a719c9c0860914ab2a8..404f868129e22cd627d350d61f74806f5b31a8ad:/services/workbench2/src/views-components/token-dialog/token-dialog.test.tsx

diff --git a/services/workbench2/src/views-components/token-dialog/token-dialog.test.tsx b/services/workbench2/src/views-components/token-dialog/token-dialog.test.tsx
index 400bb1e687..ec68beab9d 100644
--- a/services/workbench2/src/views-components/token-dialog/token-dialog.test.tsx
+++ b/services/workbench2/src/views-components/token-dialog/token-dialog.test.tsx
@@ -88,7 +88,7 @@ describe('<CurrentTokenDialog />', () => {
     });
   });
 
-  describe('copy to clipboard button', () => {
+  describe('Copy link to clipboard button', () => {
     beforeEach(() => {
       wrapper = mount(
         <Provider store={store}>
