X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/eb5b8638a308f7954f83a6a6659ae97d4f4e082d..891968f359d1de00df8087b110c4533aaa43a953:/services/workbench2/src/views-components/token-dialog/token-dialog.tsx

diff --git a/services/workbench2/src/views-components/token-dialog/token-dialog.tsx b/services/workbench2/src/views-components/token-dialog/token-dialog.tsx
index e6f3ed582c..ad1093d7e5 100644
--- a/services/workbench2/src/views-components/token-dialog/token-dialog.tsx
+++ b/services/workbench2/src/views-components/token-dialog/token-dialog.tsx
@@ -140,7 +140,7 @@ unset ARVADOS_API_HOST_INSECURE`
                         variant="contained"
                         className={classes.actionButton}
                     >
-                        COPY TO CLIPBOARD
+                        Copy link to clipBOARD
                     </Button>
                 </CopyToClipboard>
                 <Typography>
