X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/eb2560b06f58e029b63a169a6809ba514ceab072..341b552800f6866fc3f73b4f6c1468425e485694:/src/validators/validators.tsx

diff --git a/src/validators/validators.tsx b/src/validators/validators.tsx
index 755cd7f7b4..edc472657e 100644
--- a/src/validators/validators.tsx
+++ b/src/validators/validators.tsx
@@ -9,7 +9,6 @@ export const TAG_KEY_VALIDATION = [require, maxLength(255)];
 export const TAG_VALUE_VALIDATION = [require, maxLength(255)];
 
 export const PROJECT_NAME_VALIDATION = [require, maxLength(255)];
-export const PROJECT_DESCRIPTION_VALIDATION = [maxLength(255)];
 
 export const COLLECTION_NAME_VALIDATION = [require, maxLength(255)];
 export const COLLECTION_DESCRIPTION_VALIDATION = [maxLength(255)];
