X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/e79b7364ea28b6f0719c9adf409ba1217b9ccac8..e9a475f58a3f8f8637c81e4d359f37ce902a341b:/src/validators/is-float.tsx

diff --git a/src/validators/is-float.tsx b/src/validators/is-float.tsx
index 9bde5f949e..5cbfb8378b 100644
--- a/src/validators/is-float.tsx
+++ b/src/validators/is-float.tsx
@@ -2,7 +2,7 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import { isInteger, isNumber } from 'lodash';
+import { isNumber } from 'lodash';
 
 const ERROR_MESSAGE = 'This field must be a float';
 
