X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/e63198a93d7b537ffbb68b8210c99f76041fd112..9b28d6d29d9609adc86e3fdc136873c3cf6114ed:/src/validators/validators.tsx

diff --git a/src/validators/validators.tsx b/src/validators/validators.tsx
index fdeb8fa874..95edadfdd1 100644
--- a/src/validators/validators.tsx
+++ b/src/validators/validators.tsx
@@ -6,4 +6,16 @@ import { require } from './require';
 import { maxLength } from './max-length';
 
 export const TAG_KEY_VALIDATION = [require, maxLength(255)];
-export const TAG_VALUE_VALIDATION = [require, maxLength(255)];
\ No newline at end of file
+export const TAG_VALUE_VALIDATION = [require, maxLength(255)];
+
+export const PROJECT_NAME_VALIDATION = [require, maxLength(255)];
+export const PROJECT_DESCRIPTION_VALIDATION = [maxLength(255)];
+
+export const COLLECTION_NAME_VALIDATION = [require, maxLength(255)];
+export const COLLECTION_DESCRIPTION_VALIDATION = [maxLength(255)];
+export const COLLECTION_PROJECT_VALIDATION = [require];
+
+export const COPY_NAME_VALIDATION = [require, maxLength(255)];
+export const COPY_FILE_VALIDATION = [require];
+
+export const MOVE_TO_VALIDATION = [require];
