X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/d92b067614b451c27a8bd702253e87278defa7a3..2faacbe1f132f9349420e52e829d884044550fa4:/src/views-components/search-bar/search-bar-view.test.tsx

diff --git a/src/views-components/search-bar/search-bar-view.test.tsx b/src/views-components/search-bar/search-bar-view.test.tsx
index 5cd1545c2f..801bf7ad35 100644
--- a/src/views-components/search-bar/search-bar-view.test.tsx
+++ b/src/views-components/search-bar/search-bar-view.test.tsx
@@ -98,6 +98,11 @@ const mockSearchProps = () => ({
     openView: jest.fn(),
     loseView: jest.fn(),
     closeView: jest.fn(),
+    saveRecentQuery: jest.fn(),
+    loadRecentQueries: () => ['test'],
     saveQuery: jest.fn(),
-    loadQueries: () => ['test']
+    deleteSavedQuery: jest.fn(),
+    openSearchView: jest.fn(),
+    editSavedQuery: jest.fn(),
+    navigateTo: jest.fn()
 });
\ No newline at end of file
