X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/d5d8ac7ffd8b9763ccb9c59ba2d7617d87649419..5017989693137cabe7f00a00c51db35625f9b55f:/src/views-components/form-fields/user-form-fields.tsx

diff --git a/src/views-components/form-fields/user-form-fields.tsx b/src/views-components/form-fields/user-form-fields.tsx
index 856344492f..11d7d80280 100644
--- a/src/views-components/form-fields/user-form-fields.tsx
+++ b/src/views-components/form-fields/user-form-fields.tsx
@@ -18,13 +18,6 @@ export const UserEmailField = () =>
         autoFocus={true}
         label="Email" />;
 
-export const UserIdentityUrlField = () =>
-    <Field
-        name='identityUrl'
-        component={TextField}
-        validate={USER_LENGTH_VALIDATION}
-        label="Identity URL Prefix" />;
-
 export const UserVirtualMachineField = ({ data }: any) =>
     <div style={{ marginBottom: '21px' }}>
         <InputLabel>Virtual Machine</InputLabel>
