X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/d4a6611549777e48c6c92a002791bd4b0e42a6f4..44821dc84765936ce99fa2d760ef683281f0a578:/src/views-components/context-menu/actions/copy-to-clipboard-action.test.tsx

diff --git a/src/views-components/context-menu/actions/copy-to-clipboard-action.test.tsx b/src/views-components/context-menu/actions/copy-to-clipboard-action.test.tsx
index 83cd03289b..898287399d 100644
--- a/src/views-components/context-menu/actions/copy-to-clipboard-action.test.tsx
+++ b/src/views-components/context-menu/actions/copy-to-clipboard-action.test.tsx
@@ -2,10 +2,10 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { shallow, configure } from 'enzyme';
 import { ListItem } from "@material-ui/core";
-import * as Adapter from 'enzyme-adapter-react-16';
+import Adapter from 'enzyme-adapter-react-16';
 import { CopyToClipboardAction } from './copy-to-clipboard-action';
 
 configure({ adapter: new Adapter() });
