X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/ced486022308d18befcb1c83676c7d34ecc85f9d..dab6ac81df3cb99f1eb0edbddc07d731dfd61eb1:/src/views/run-process-panel/inputs/project-input.tsx

diff --git a/src/views/run-process-panel/inputs/project-input.tsx b/src/views/run-process-panel/inputs/project-input.tsx
index 688af4aafa..d91a6b8483 100644
--- a/src/views/run-process-panel/inputs/project-input.tsx
+++ b/src/views/run-process-panel/inputs/project-input.tsx
@@ -99,7 +99,7 @@ export const ProjectInputComponent = connect(mapStateToProps)(
             }
         }
 
-        invalid = () => (!this.state.project || this.state.project.writableBy.indexOf(this.props.userUuid) === -1);
+        invalid = () => (!this.state.project || !this.state.project.canWrite);
 
         renderInput() {
             return <GenericInput
