X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/cb690390d4f253c3bbb9c543e243cf988f39fbb3..6fa7f9fbcf20aa866eed0618bd09e1ce2e109baa:/services/workbench2/src/views-components/baner/banner.tsx

diff --git a/services/workbench2/src/views-components/baner/banner.tsx b/services/workbench2/src/views-components/baner/banner.tsx
index ac5b89439c..79fe888616 100644
--- a/services/workbench2/src/views-components/baner/banner.tsx
+++ b/services/workbench2/src/views-components/baner/banner.tsx
@@ -82,7 +82,9 @@ export const BannerComponent = (props: BannerComponentProps) => {
                                 localStorage.setItem(BANNER_LOCAL_STORAGE_KEY, JSON.stringify(bannerFileData));
                             });
                     }
-                });
+                }).catch((e) => {
+		    console.error("Failed to load banner", e);
+		});
         }
     }, [bannerUUID, keepWebInlineServiceUrl, openBanner, isOpen]);
 
