X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/cb3411270bc6254ffa8519f7c4bcee71b8002869..36871ffc981832ac7cf5131e9ac36626c49d3a2b:/services/workbench2/src/components/data-table/data-table.tsx

diff --git a/services/workbench2/src/components/data-table/data-table.tsx b/services/workbench2/src/components/data-table/data-table.tsx
index 4fd019cecf..d3bbab5077 100644
--- a/services/workbench2/src/components/data-table/data-table.tsx
+++ b/services/workbench2/src/components/data-table/data-table.tsx
@@ -97,17 +97,18 @@ const styles: StyleRulesCallback<CssRules> = (theme: Theme) => ({
         display: "flex",
         width: '2rem',
         height: "1.5rem",
-        paddingLeft: '0.75rem',
-        marginRight: '0.2rem'
+        paddingLeft: '0.9rem',
+        marginRight: '0.5rem'
     },
     checkBoxCell: {
         padding: "0",
     },
     clickBox: {
-        width: '1.3rem',
-        height: "1.3rem",
-        paddingLeft: '0.2rem',
-        paddingTop: '0rem',
+        display: 'flex',
+        width: '1.6rem',
+        height: "1.5rem",
+        paddingLeft: '0.35rem',
+        paddingTop: '0.1rem',
         marginLeft: '0.5rem',
         cursor: "pointer",
     },
