X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/c8d7659860af3b12d87ef29478bc1b825a9b3d2f..034bf8ad6df6c47d3c392ae8233c8d08dc6b4609:/src/views/process-panel/process-panel-root.tsx

diff --git a/src/views/process-panel/process-panel-root.tsx b/src/views/process-panel/process-panel-root.tsx
index bc485d9f9d..ed808b361a 100644
--- a/src/views/process-panel/process-panel-root.tsx
+++ b/src/views/process-panel/process-panel-root.tsx
@@ -121,7 +121,7 @@ export const ProcessPanelRoot = withStyles(styles)(
                     onCopy={props.onCopyToClipboard}
                     process={process} />
             </MPVPanelContent>
-            <MPVPanelContent forwardProps xs maxHeight='50%' data-cy="process-logs">
+            <MPVPanelContent forwardProps xs minHeight='50%' data-cy="process-logs">
                 <ProcessLogsCard
                     onCopy={props.onCopyToClipboard}
                     process={process}
