X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/c7bf82b621dae10a68a74b95439fa8f4ae3c502f..7d598997ce1851f37ac0ec21c47abc76d5e84277:/services/api/db/structure.sql

diff --git a/services/api/db/structure.sql b/services/api/db/structure.sql
index 2d0c76f09d..aa05031fe0 100644
--- a/services/api/db/structure.sql
+++ b/services/api/db/structure.sql
@@ -3,6 +3,7 @@
 --
 
 SET statement_timeout = 0;
+SET lock_timeout = 0;
 SET client_encoding = 'UTF8';
 SET standard_conforming_strings = on;
 SET check_function_bodies = false;
