X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/c66cf8a682bd326a38c069045bfc116c61603bc8..44c8f9ed561513b607d3eca752ad3e1efd376f56:/services/workbench2/src/views/process-panel/process-panel-root.tsx

diff --git a/services/workbench2/src/views/process-panel/process-panel-root.tsx b/services/workbench2/src/views/process-panel/process-panel-root.tsx
index ce81bd74c2..2a9b3882e8 100644
--- a/services/workbench2/src/views/process-panel/process-panel-root.tsx
+++ b/services/workbench2/src/views/process-panel/process-panel-root.tsx
@@ -46,7 +46,7 @@ export interface ProcessPanelRootDataProps {
     outputDefinitions: CommandOutputParameter[];
     outputParams: ProcessIOParameter[] | null;
     nodeInfo: NodeInstanceType | null;
-    usageReport: CollectionFile | null;
+    usageReport: string | null;
 }
 
 export interface ProcessPanelRootActionProps {
