X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/bde866ac574bdf34e17c1d8124f2dc36e854ad3c..32e3370febf2e29c45e27065cdc14a883775f261:/src/views/run-process-panel/inputs/directory-array-input.tsx

diff --git a/src/views/run-process-panel/inputs/directory-array-input.tsx b/src/views/run-process-panel/inputs/directory-array-input.tsx
index 6da3210371..a7d83daef5 100644
--- a/src/views/run-process-panel/inputs/directory-array-input.tsx
+++ b/src/views/run-process-panel/inputs/directory-array-input.tsx
@@ -280,7 +280,7 @@ const DirectoryArrayInputComponent = connect(mapStateToProps)(
                     </div>
                     <Divider />
                     <div className={classes.chips}>
-                        <Typography variant='subheading'>Selected collections ({this.state.directories.length}):</Typography>
+                        <Typography variant='subtitle1'>Selected collections ({this.state.directories.length}):</Typography>
                         <Chips
                             orderable
                             deletable
