X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/b676312f840c3f12855a4392afe90b275dd25b97..1416f698b72de4b09350d9c2fb25c1405c3247bc:/src/views/main-panel/main-panel.tsx

diff --git a/src/views/main-panel/main-panel.tsx b/src/views/main-panel/main-panel.tsx
index fac3da6715..264390a8b3 100644
--- a/src/views/main-panel/main-panel.tsx
+++ b/src/views/main-panel/main-panel.tsx
@@ -24,6 +24,8 @@ const mapStateToProps = (state: RootState): MainPanelRootDataProps => {
         siteBanner: state.auth.config.clusterConfig.Workbench.SiteName,
         sessionIdleTimeout: parse(state.auth.config.clusterConfig.Workbench.IdleTimeout, 's') || 0,
         sidePanelIsCollapsed: state.sidePanel.collapsedState,
+        isTransitioning: state.detailsPanel.isTransitioning,
+        currentSideWidth: state.sidePanel.currentSideWidth
     };
 };
 
