X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/b56fac763b24e34c5c2ba42cf9e183ffcc2014fc..ceda57340f34d71fb4289b344e6ca839db06f5e7:/src/validators/validators.tsx

diff --git a/src/validators/validators.tsx b/src/validators/validators.tsx
index 1980ed802e..c601df1741 100644
--- a/src/validators/validators.tsx
+++ b/src/validators/validators.tsx
@@ -22,5 +22,7 @@ export const MOVE_TO_VALIDATION = [require];
 
 export const PROCESS_NAME_VALIDATION = [require, maxLength(255)];
 
+export const REPOSITORY_NAME_VALIDATION = [require, maxLength(255)];
+
 export const SSH_KEY_PUBLIC_VALIDATION = [require, isRsaKey, maxLength(1024)];
-export const SSH_KEY_NAME_VALIDATION = [require, maxLength(255)];
\ No newline at end of file
+export const SSH_KEY_NAME_VALIDATION = [require, maxLength(255)];
