X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/b12a180cf035192be3e22dfa5a2200d4969ce51a..c4b35e715ff5c6840aabfb76b540e2fad341b0ec:/src/validators/validators.tsx

diff --git a/src/validators/validators.tsx b/src/validators/validators.tsx
index 106c74da76..95edadfdd1 100644
--- a/src/validators/validators.tsx
+++ b/src/validators/validators.tsx
@@ -16,6 +16,6 @@ export const COLLECTION_DESCRIPTION_VALIDATION = [maxLength(255)];
 export const COLLECTION_PROJECT_VALIDATION = [require];
 
 export const COPY_NAME_VALIDATION = [require, maxLength(255)];
-export const MAKE_A_COPY_VALIDATION = [require, maxLength(255)];
+export const COPY_FILE_VALIDATION = [require];
 
 export const MOVE_TO_VALIDATION = [require];
