X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/a2453ddec7ed7e087dcf522a183f0498d8cba456..034bf8ad6df6c47d3c392ae8233c8d08dc6b4609:/src/views/process-panel/process-log-card.tsx

diff --git a/src/views/process-panel/process-log-card.tsx b/src/views/process-panel/process-log-card.tsx
index 0abb725bce..4890c726f4 100644
--- a/src/views/process-panel/process-log-card.tsx
+++ b/src/views/process-panel/process-log-card.tsx
@@ -55,6 +55,7 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
     },
     logViewer: {
         height: '100%',
+        overflowY: 'scroll', // Required for MacOS's Safari -- See #19687
     },
     logViewerContainer: {
         height: '100%',
@@ -153,9 +154,9 @@ export const ProcessLogsCard = withStyles(styles)(
                         <Tooltip title={`Maximize ${panelName || 'panel'}`} disableFocusListener>
                             <IconButton onClick={doMaximizePanel}><MaximizeIcon /></IconButton>
                         </Tooltip> }
-                        { doHidePanel && !panelMaximized &&
+                        { doHidePanel &&
                         <Tooltip title={`Close ${panelName || 'panel'}`} disableFocusListener>
-                            <IconButton onClick={doHidePanel}><CloseIcon /></IconButton>
+                            <IconButton disabled={panelMaximized} onClick={doHidePanel}><CloseIcon /></IconButton>
                         </Tooltip> }
                     </Grid>}
                     title={
