X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/a23cfd6defb8dab9ac9afe13034f7b667f07acca..5d6640046afef7dc3714b784430e18bf2f2153fe:/src/views/process-panel/process-log-code-snippet.tsx?ds=sidebyside

diff --git a/src/views/process-panel/process-log-code-snippet.tsx b/src/views/process-panel/process-log-code-snippet.tsx
index 2b7391c294..50d343d622 100644
--- a/src/views/process-panel/process-log-code-snippet.tsx
+++ b/src/views/process-panel/process-log-code-snippet.tsx
@@ -33,7 +33,7 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
         },
     },
     logText: {
-        padding: theme.spacing.unit * 0.5,
+        padding: `0 ${theme.spacing.unit*0.5}px`,
     },
     wordWrap: {
         whiteSpace: 'pre-wrap',
@@ -126,4 +126,4 @@ export const ProcessLogCodeSnippet = withStyles(styles)(connect(mapStateToProps)
                 ) }
             </div>
         </MuiThemeProvider>
-    }));
\ No newline at end of file
+    }));
