X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/a080578919155fc6f6d1be2f966951b629ae5b45..7ae86efd9905582df4191910528c3803a68ba81b:/src/views/project-panel/project-panel.tsx

diff --git a/src/views/project-panel/project-panel.tsx b/src/views/project-panel/project-panel.tsx
index 17b0fd723d..81d84990a4 100644
--- a/src/views/project-panel/project-panel.tsx
+++ b/src/views/project-panel/project-panel.tsx
@@ -38,7 +38,7 @@ const renderName = (item: ProjectPanelItem) =>
             {renderIcon(item)}
         </Grid>
         <Grid item>
-            <Typography color="primary">
+            <Typography color="default">
                 {item.name}
             </Typography>
         </Grid>
