X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/9f32ba406d862fa0ad79ac7c23c6b0aced1bdf13..a6b9fb8166440eef3144150024a875c858db9bb6:/services/workbench2/src/views-components/main-app-bar/account-menu.tsx

diff --git a/services/workbench2/src/views-components/main-app-bar/account-menu.tsx b/services/workbench2/src/views-components/main-app-bar/account-menu.tsx
index c2cc0e2a47..02dd54f1c4 100644
--- a/services/workbench2/src/views-components/main-app-bar/account-menu.tsx
+++ b/services/workbench2/src/views-components/main-app-bar/account-menu.tsx
@@ -17,7 +17,7 @@ import {
     navigateToSiteManager,
     navigateToSshKeysUser,
     navigateToMyAccount,
-    navigateToLinkAccount
+    navigateToLinkAccount,
 } from 'store/navigation/navigation-action';
 import { openUserVirtualMachines } from "store/virtual-machines/virtual-machines-actions";
 import { pluginConfig } from 'plugins';
