X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/9f1850a385ee8e0a011474de19ee6507b0b168f3..7f8fa5edc5175ffda9fdfaa28081f799ae485ec0:/services/workbench2/src/components/search-input/search-input.test.tsx

diff --git a/services/workbench2/src/components/search-input/search-input.test.tsx b/services/workbench2/src/components/search-input/search-input.test.tsx
index ba70f752b9..213b46404b 100644
--- a/services/workbench2/src/components/search-input/search-input.test.tsx
+++ b/services/workbench2/src/components/search-input/search-input.test.tsx
@@ -11,11 +11,10 @@ configure({ adapter: new Adapter() });
 
 describe("<SearchInput />", () => {
 
-    jest.useFakeTimers();
-
     let onSearch: () => void;
 
     beforeEach(() => {
+        jest.useFakeTimers();
         onSearch = jest.fn();
     });
 
