X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/9a72938d7fa4786aed241f619476490570933f15..4d892bd66c5d11d8cbde42348099e92da0c21a99:/services/workbench2/src/views/process-panel/process-panel-root.tsx?ds=sidebyside

diff --git a/services/workbench2/src/views/process-panel/process-panel-root.tsx b/services/workbench2/src/views/process-panel/process-panel-root.tsx
index 21f38b0938..c8e93aa3ae 100644
--- a/services/workbench2/src/views/process-panel/process-panel-root.tsx
+++ b/services/workbench2/src/views/process-panel/process-panel-root.tsx
@@ -24,7 +24,6 @@ import { ProcessCmdCard } from "./process-cmd-card";
 import { ContainerRequestResource } from "models/container-request";
 import { OutputDetails, NodeInstanceType } from "store/process-panel/process-panel";
 import { NotFoundView } from 'views/not-found-panel/not-found-panel';
-import { CollectionFile } from 'models/collection-file';
 
 type CssRules = "root";
 
