X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/92308b1b044dee2970c4409a0da660ccbecce945..e45e9d32ac3349c19785f3041e0e5e8025f93c32:/services/workbench2/src/views-components/sharing-dialog/sharing-dialog-component.test.tsx

diff --git a/services/workbench2/src/views-components/sharing-dialog/sharing-dialog-component.test.tsx b/services/workbench2/src/views-components/sharing-dialog/sharing-dialog-component.test.tsx
index 2fc4d01ad6..86370a1e21 100644
--- a/services/workbench2/src/views-components/sharing-dialog/sharing-dialog-component.test.tsx
+++ b/services/workbench2/src/views-components/sharing-dialog/sharing-dialog-component.test.tsx
@@ -8,7 +8,8 @@ import Adapter from 'enzyme-adapter-react-16';
 import { Provider } from 'react-redux';
 import { combineReducers, createStore } from 'redux';
 
-import SharingDialogComponent, {
+import {
+    SharingDialogComponent,
     SharingDialogComponentProps,
 } from './sharing-dialog-component';
 import {
