X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/920ccdc45d7c3a8517b430ab17af53c3fc23cf6d..b1a6da4a288560a87e0e38ad2fd73fb227e3fc66:/src/views/workbench/workbench.tsx

diff --git a/src/views/workbench/workbench.tsx b/src/views/workbench/workbench.tsx
index 025540e22e..cba89b3ba9 100644
--- a/src/views/workbench/workbench.tsx
+++ b/src/views/workbench/workbench.tsx
@@ -79,6 +79,8 @@ import { UserPanel } from '~/views/user-panel/user-panel';
 import { UserAttributesDialog } from '~/views-components/user-dialog/attributes-dialog';
 import { CreateUserDialog } from '~/views-components/dialog-forms/create-user-dialog';
 import { HelpApiClientAuthorizationDialog } from '~/views-components/api-client-authorizations-dialog/help-dialog';
+import { UserManageDialog } from '~/views-components/user-dialog/manage-dialog';
+import { SetupShellAccountDialog } from '~/views-components/dialog-forms/setup-shell-account-dialog';
 
 type CssRules = 'root' | 'container' | 'splitter' | 'asidePanel' | 'contentWrapper' | 'content';
 
@@ -207,12 +209,14 @@ export const WorkbenchPanel =
             <RepositoryAttributesDialog />
             <RepositoriesSampleGitDialog />
             <RichTextEditorDialog />
+            <SetupShellAccountDialog />
             <SharingDialog />
             <Snackbar />
             <UpdateCollectionDialog />
             <UpdateProcessDialog />
             <UpdateProjectDialog />
             <UserAttributesDialog />
+            <UserManageDialog />
             <VirtualMachineAttributesDialog />
         </Grid>
     );
\ No newline at end of file
