X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/8dedd02357a95a0ae2c7961c8f1d0896b6311b3b..c6aa0eb37e4d05b2a81f1528222dac32e0501db5:/services/workbench2/src/views-components/auto-logout/auto-logout.test.tsx

diff --git a/services/workbench2/src/views-components/auto-logout/auto-logout.test.tsx b/services/workbench2/src/views-components/auto-logout/auto-logout.test.tsx
index 28084ed1c1..b07e3dccfa 100644
--- a/services/workbench2/src/views-components/auto-logout/auto-logout.test.tsx
+++ b/services/workbench2/src/views-components/auto-logout/auto-logout.test.tsx
@@ -31,28 +31,28 @@ describe('<AutoLogoutComponent />', () => {
     });
 
     it('should logout after idle timeout', () => {
-        jest.runTimersToTime((sessionIdleTimeout-1)*1000);
+        jest.advanceTimersByTime((sessionIdleTimeout-1)*1000);
         expect(props.doLogout).not.toBeCalled();
-        jest.runTimersToTime(1*1000);
+        jest.advanceTimersByTime(1*1000);
         expect(props.doLogout).toBeCalled();
     });
 
     it('should warn the user previous to close the session', () => {
-        jest.runTimersToTime((sessionIdleTimeout-lastWarningDuration-1)*1000);
+        jest.advanceTimersByTime((sessionIdleTimeout-lastWarningDuration-1)*1000);
         expect(props.doWarn).not.toBeCalled();
-        jest.runTimersToTime(1*1000);
+        jest.advanceTimersByTime(1*1000);
         expect(props.doWarn).toBeCalled();
     });
 
     it('should reset the idle timer when activity event is received', () => {
-        jest.runTimersToTime((sessionIdleTimeout-lastWarningDuration-1)*1000);
+        jest.advanceTimersByTime((sessionIdleTimeout-lastWarningDuration-1)*1000);
         expect(props.doWarn).not.toBeCalled();
         // Simulate activity from other window/tab
         eventListeners.storage({
             key: LAST_ACTIVE_TIMESTAMP,
             newValue: '42' // value currently doesn't matter
         })
-        jest.runTimersToTime(1*1000);
+        jest.advanceTimersByTime(1*1000);
         // Warning should not appear because idle timer was reset
         expect(props.doWarn).not.toBeCalled();
     });
