X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/8a85c509e4f2100082cfed6157d31c8651b861c9..52b7cea2ae6e69e5ccfebb6a393ab6054f39c552:/src/validators/is-float.tsx

diff --git a/src/validators/is-float.tsx b/src/validators/is-float.tsx
index 9bde5f949e..5cbfb8378b 100644
--- a/src/validators/is-float.tsx
+++ b/src/validators/is-float.tsx
@@ -2,7 +2,7 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import { isInteger, isNumber } from 'lodash';
+import { isNumber } from 'lodash';
 
 const ERROR_MESSAGE = 'This field must be a float';
 
