X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/86ec3f61b905b2887cf7158ac97a4b817492ebad..dd20d6a93d7ec92e477b3d957da8f984cfbfdff9:/doc/sdk/index.textile?ds=inline

diff --git a/doc/sdk/index.textile b/doc/sdk/index.textile
new file mode 100644
index 0000000000..614e100c31
--- /dev/null
+++ b/doc/sdk/index.textile
@@ -0,0 +1,8 @@
+---
+layout: default
+navsection: sdk
+title: Arvados Software Development Kit (SDK)
+navorder: 0
+---
+
+notextile. <iframe src="python/" style="width:100%; height:100%" />
