X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/846d1322282be39bd2db362c7f97a4068a3e1867..36871ffc981832ac7cf5131e9ac36626c49d3a2b:/services/workbench2/src/components/data-table/data-table.tsx

diff --git a/services/workbench2/src/components/data-table/data-table.tsx b/services/workbench2/src/components/data-table/data-table.tsx
index b9d529c2fa..d3bbab5077 100644
--- a/services/workbench2/src/components/data-table/data-table.tsx
+++ b/services/workbench2/src/components/data-table/data-table.tsx
@@ -97,16 +97,18 @@ const styles: StyleRulesCallback<CssRules> = (theme: Theme) => ({
         display: "flex",
         width: '2rem',
         height: "1.5rem",
-        paddingLeft: '0.8rem',
+        paddingLeft: '0.9rem',
         marginRight: '0.5rem'
     },
     checkBoxCell: {
         padding: "0",
     },
     clickBox: {
-        width: '1.4rem',
-        height: "1.4rem",
-        paddingLeft: '0.25rem',
+        display: 'flex',
+        width: '1.6rem',
+        height: "1.5rem",
+        paddingLeft: '0.35rem',
+        paddingTop: '0.1rem',
         marginLeft: '0.5rem',
         cursor: "pointer",
     },
