X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/7f137c5a4162717b74668a513b8b10a1ed3d8577..92dd5d32b573b5c90f3ce72dc207f6d0e7f21178:/src/views/workflow-panel/workflow-panel-view.tsx

diff --git a/src/views/workflow-panel/workflow-panel-view.tsx b/src/views/workflow-panel/workflow-panel-view.tsx
index bb94ed5fac..18a254bd36 100644
--- a/src/views/workflow-panel/workflow-panel-view.tsx
+++ b/src/views/workflow-panel/workflow-panel-view.tsx
@@ -6,7 +6,7 @@ import * as React from 'react';
 import { DataExplorer } from "~/views-components/data-explorer/data-explorer";
 import { WorkflowIcon } from '~/components/icon/icon';
 import { DataTableDefaultView } from '~/components/data-table-default-view/data-table-default-view';
-import { WORKFLOW_PANEL_ID, workflowPanelActions } from '~/store/workflow-panel/workflow-panel-actions';
+import { WORKFLOW_PANEL_ID } from '~/store/workflow-panel/workflow-panel-actions';
 import {
     ResourceLastModifiedDate,
     RosurceWorkflowName,
