X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/7c2d7b25747a06919e8ec64f0b4391c33092d965..78ae561901fff56fad51a5aea9c92f3cea6f4bb3:/services/api/db/structure.sql

diff --git a/services/api/db/structure.sql b/services/api/db/structure.sql
index 2d0c76f09d..48bc57ab97 100644
--- a/services/api/db/structure.sql
+++ b/services/api/db/structure.sql
@@ -153,7 +153,6 @@ ALTER SEQUENCE authorized_keys_id_seq OWNED BY authorized_keys.id;
 
 CREATE TABLE collections (
     id integer NOT NULL,
-    locator character varying(255),
     owner_uuid character varying(255),
     created_at timestamp without time zone NOT NULL,
     modified_by_client_uuid character varying(255),
@@ -166,7 +165,11 @@ CREATE TABLE collections (
     redundancy_confirmed_as integer,
     updated_at timestamp without time zone NOT NULL,
     uuid character varying(255),
-    manifest_text text
+    manifest_text text,
+    name character varying(255),
+    description character varying(255),
+    properties text,
+    expires_at date
 );
 
 
@@ -268,7 +271,7 @@ CREATE TABLE groups (
     modified_by_client_uuid character varying(255),
     modified_by_user_uuid character varying(255),
     modified_at timestamp without time zone,
-    name character varying(255),
+    name character varying(255) NOT NULL,
     description text,
     updated_at timestamp without time zone NOT NULL,
     group_class character varying(255)
@@ -350,7 +353,9 @@ CREATE TABLE job_tasks (
     created_at timestamp without time zone NOT NULL,
     updated_at timestamp without time zone NOT NULL,
     created_by_job_task_uuid character varying(255),
-    qsequence bigint
+    qsequence bigint,
+    started_at timestamp without time zone,
+    finished_at timestamp without time zone
 );
 
 
@@ -417,16 +422,17 @@ CREATE TABLE jobs (
     output character varying(255),
     created_at timestamp without time zone NOT NULL,
     updated_at timestamp without time zone NOT NULL,
-    priority character varying(255),
     is_locked_by_uuid character varying(255),
     log character varying(255),
     tasks_summary text,
     runtime_constraints text,
     nondeterministic boolean,
     repository character varying(255),
-    output_is_persistent boolean DEFAULT false NOT NULL,
     supplied_script_version character varying(255),
-    docker_image_locator character varying(255)
+    docker_image_locator character varying(255),
+    priority integer DEFAULT 0 NOT NULL,
+    description text,
+    state character varying(255)
 );
 
 
@@ -634,7 +640,9 @@ CREATE TABLE nodes (
     first_ping_at timestamp without time zone,
     last_ping_at timestamp without time zone,
     info text,
-    updated_at timestamp without time zone NOT NULL
+    updated_at timestamp without time zone NOT NULL,
+    properties text,
+    job_uuid character varying(255)
 );
 
 
@@ -675,7 +683,10 @@ CREATE TABLE pipeline_instances (
     updated_at timestamp without time zone NOT NULL,
     properties text,
     state character varying(255),
-    components_summary text
+    components_summary text,
+    started_at timestamp without time zone,
+    finished_at timestamp without time zone,
+    description text
 );
 
 
@@ -864,7 +875,7 @@ ALTER SEQUENCE traits_id_seq OWNED BY traits.id;
 CREATE TABLE users (
     id integer NOT NULL,
     uuid character varying(255),
-    owner_uuid character varying(255),
+    owner_uuid character varying(255) NOT NULL,
     created_at timestamp without time zone NOT NULL,
     modified_by_client_uuid character varying(255),
     modified_by_user_uuid character varying(255),
@@ -1266,6 +1277,20 @@ ALTER TABLE ONLY virtual_machines
     ADD CONSTRAINT virtual_machines_pkey PRIMARY KEY (id);
 
 
+--
+-- Name: collection_owner_uuid_name_unique; Type: INDEX; Schema: public; Owner: -; Tablespace: 
+--
+
+CREATE UNIQUE INDEX collection_owner_uuid_name_unique ON collections USING btree (owner_uuid, name);
+
+
+--
+-- Name: groups_owner_uuid_name_unique; Type: INDEX; Schema: public; Owner: -; Tablespace: 
+--
+
+CREATE UNIQUE INDEX groups_owner_uuid_name_unique ON groups USING btree (owner_uuid, name);
+
+
 --
 -- Name: index_api_client_authorizations_on_api_client_id; Type: INDEX; Schema: public; Owner: -; Tablespace: 
 --
@@ -1784,6 +1809,13 @@ CREATE UNIQUE INDEX index_virtual_machines_on_uuid ON virtual_machines USING btr
 CREATE UNIQUE INDEX links_tail_name_unique_if_link_class_name ON links USING btree (tail_uuid, name) WHERE ((link_class)::text = 'name'::text);
 
 
+--
+-- Name: pipeline_template_owner_uuid_name_unique; Type: INDEX; Schema: public; Owner: -; Tablespace: 
+--
+
+CREATE UNIQUE INDEX pipeline_template_owner_uuid_name_unique ON pipeline_templates USING btree (owner_uuid, name);
+
+
 --
 -- Name: unique_schema_migrations; Type: INDEX; Schema: public; Owner: -; Tablespace: 
 --
@@ -1975,4 +2007,26 @@ INSERT INTO schema_migrations (version) VALUES ('20140627210837');
 
 INSERT INTO schema_migrations (version) VALUES ('20140709172343');
 
-INSERT INTO schema_migrations (version) VALUES ('20140714184006');
\ No newline at end of file
+INSERT INTO schema_migrations (version) VALUES ('20140714184006');
+
+INSERT INTO schema_migrations (version) VALUES ('20140811184643');
+
+INSERT INTO schema_migrations (version) VALUES ('20140817035914');
+
+INSERT INTO schema_migrations (version) VALUES ('20140818125735');
+
+INSERT INTO schema_migrations (version) VALUES ('20140826180337');
+
+INSERT INTO schema_migrations (version) VALUES ('20140828141043');
+
+INSERT INTO schema_migrations (version) VALUES ('20140909183946');
+
+INSERT INTO schema_migrations (version) VALUES ('20140911221252');
+
+INSERT INTO schema_migrations (version) VALUES ('20140918141529');
+
+INSERT INTO schema_migrations (version) VALUES ('20140918153541');
+
+INSERT INTO schema_migrations (version) VALUES ('20140918153705');
+
+INSERT INTO schema_migrations (version) VALUES ('20140924091559');
\ No newline at end of file
