X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/71b9264c1720e619f8cfcb297a7848ece420c61c..563d8f1121c966ca15f4b2b2751ba4e8978bb16e:/src/views/run-process-panel/run-process-second-step.tsx

diff --git a/src/views/run-process-panel/run-process-second-step.tsx b/src/views/run-process-panel/run-process-second-step.tsx
index 8e855ab395..a2ed9a21f1 100644
--- a/src/views/run-process-panel/run-process-second-step.tsx
+++ b/src/views/run-process-panel/run-process-second-step.tsx
@@ -12,7 +12,7 @@ import { RootState } from '~/store/store';
 import { isValid } from 'redux-form';
 import { RUN_PROCESS_INPUTS_FORM } from './run-process-inputs-form';
 import { RunProcessAdvancedForm, RUN_PROCESS_ADVANCED_FORM } from './run-process-advanced-form';
-import { createSelector, createStructuredSelector } from 'reselect';
+import { createStructuredSelector } from 'reselect';
 import { WorkflowPresetSelect } from '~/views/run-process-panel/workflow-preset-select';
 import { selectPreset } from '~/store/run-process-panel/run-process-panel-actions';
 
