X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/6d1c41d6fd83824669cd1a6d714ea6da1ae7ab4c..89fc1810ba39a7a0aebccba690c7bc663bca8c0b:/services/workbench2/src/validators/require.tsx

diff --git a/services/workbench2/src/validators/require.tsx b/services/workbench2/src/validators/require.tsx
index fbba02aeb4..b594bf0803 100644
--- a/services/workbench2/src/validators/require.tsx
+++ b/services/workbench2/src/validators/require.tsx
@@ -4,6 +4,6 @@
 
 export const ERROR_MESSAGE = 'This field is required.';
 
-export const require: any = (value: string) => {
+export const fieldRequire: any = (value: string) => {
     return value && value.length > 0 ? undefined : ERROR_MESSAGE;
 };
