X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/69e971b0d44effcf900cf830edf8592731aff2b1..35d6c5a870aeff7bb2cbf6ec80d306debad872c1:/src/views/run-process-panel/run-process-advanced-form.tsx

diff --git a/src/views/run-process-panel/run-process-advanced-form.tsx b/src/views/run-process-panel/run-process-advanced-form.tsx
index d63ff30ffb..0400b850a2 100644
--- a/src/views/run-process-panel/run-process-advanced-form.tsx
+++ b/src/views/run-process-panel/run-process-advanced-form.tsx
@@ -9,7 +9,6 @@ import { Grid } from '@material-ui/core';
 import { TextField } from '~/components/text-field/text-field';
 import { ExpandIcon } from '~/components/icon/icon';
 import * as IntInput from './inputs/int-input';
-import { require } from '~/validators/require';
 import { min } from '~/validators/min';
 import { optional } from '~/validators/optional';
 import { SwitchField } from '~/components/switch-field/switch-field';
