X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/66088cabf30c5291ad8894e7009d9c9af466c158..e45e9d32ac3349c19785f3041e0e5e8025f93c32:/services/workbench2/src/views-components/token-dialog/token-dialog.test.tsx

diff --git a/services/workbench2/src/views-components/token-dialog/token-dialog.test.tsx b/services/workbench2/src/views-components/token-dialog/token-dialog.test.tsx
index 400bb1e687..ec68beab9d 100644
--- a/services/workbench2/src/views-components/token-dialog/token-dialog.test.tsx
+++ b/services/workbench2/src/views-components/token-dialog/token-dialog.test.tsx
@@ -88,7 +88,7 @@ describe('<CurrentTokenDialog />', () => {
     });
   });
 
-  describe('copy to clipboard button', () => {
+  describe('Copy link to clipboard button', () => {
     beforeEach(() => {
       wrapper = mount(
         <Provider store={store}>
