X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/66088cabf30c5291ad8894e7009d9c9af466c158..0f4ba86b39293d5e6394fe3a065b159d2c898ff4:/services/workbench2/src/store/advanced-tab/advanced-tab.tsx

diff --git a/services/workbench2/src/store/advanced-tab/advanced-tab.tsx b/services/workbench2/src/store/advanced-tab/advanced-tab.tsx
index fedd551864..3e0382825c 100644
--- a/services/workbench2/src/store/advanced-tab/advanced-tab.tsx
+++ b/services/workbench2/src/store/advanced-tab/advanced-tab.tsx
@@ -591,7 +591,6 @@ const apiClientAuthorizationApiResponse = (apiResponse: ApiClientAuthorization):
 "owner_uuid": "${ownerUuid}",
 "api_token": "${stringify(apiToken)}",
 "api_client_id": "${stringify(apiClientId)}",
-"user_id": "${stringify(userId)}",
 "created_by_ip_address": "${stringify(createdByIpAddress)}",
 "last_used_by_ip_address": "${stringify(lastUsedByIpAddress)}",
 "last_used_at": "${stringify(lastUsedAt)}",
