X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/5fd5db805554d3eddd46cc911a5108fbb74b3cfc..278f75bd896ee35887282f61e10bbeaf6471011d:/src/components/data-explorer/data-explorer.test.tsx

diff --git a/src/components/data-explorer/data-explorer.test.tsx b/src/components/data-explorer/data-explorer.test.tsx
index 1ce564141c..d2ca7f7b7c 100644
--- a/src/components/data-explorer/data-explorer.test.tsx
+++ b/src/components/data-explorer/data-explorer.test.tsx
@@ -88,7 +88,6 @@ describe("<DataExplorer />", () => {
             items={[]}
         />);
         expect(dataExplorer.find(SearchInput)).toHaveLength(0);
-        expect(dataExplorer.find(ColumnSelector)).toHaveLength(0);
         expect(dataExplorer.find(TablePagination)).toHaveLength(0);
     });
 
