X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/5e87aa73a04e8c88812df1366b490333a2526c12..83e7cbb4620d7e7d61c56fb25efc2069955eb78a:/services/workbench2/src/views/project-panel/project-panel-run.tsx

diff --git a/services/workbench2/src/views/project-panel/project-panel-run.tsx b/services/workbench2/src/views/project-panel/project-panel-run.tsx
index 0dcda89e8b..e89e761389 100644
--- a/services/workbench2/src/views/project-panel/project-panel-run.tsx
+++ b/services/workbench2/src/views/project-panel/project-panel-run.tsx
@@ -174,6 +174,7 @@ const DEFAULT_VIEW_MESSAGES = ['No workflow runs found'];
 
 interface ProjectPanelRunProps {
     project?: ProjectResource;
+    paperClassName?: string;
 }
 
 const mapStateToProps = (state: RootState): ProjectPanelRunProps => {
@@ -198,5 +199,6 @@ export const ProjectPanelRun = connect(mapStateToProps)((props: ProjectPanelRunP
         defaultViewIcon={ProjectIcon}
         defaultViewMessages={DEFAULT_VIEW_MESSAGES}
         progressBar={<SubprocessProgressBar parentResource={props.project} dataExplorerId={PROJECT_PANEL_RUN_ID} />}
+        paperClassName={props.paperClassName}
     />;
 });
