X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/5d6640046afef7dc3714b784430e18bf2f2153fe..255734af1fb681dc7dda5de0cd5047e7159256ba:/src/index.tsx

diff --git a/src/index.tsx b/src/index.tsx
index ede257dc5d..ef9ff9c986 100644
--- a/src/index.tsx
+++ b/src/index.tsx
@@ -91,6 +91,9 @@ import { workflowActionSet, readOnlyWorkflowActionSet } from "views-components/c
 import { storeRedirects } from "./common/redirect-to";
 import { searchResultsActionSet } from "views-components/context-menu/action-sets/search-results-action-set";
 
+import 'bootstrap/dist/css/bootstrap.min.css';
+import '@coreui/coreui/dist/css/coreui.min.css';
+
 console.log(`Starting arvados [${getBuildInfo()}]`);
 
 addMenuActionSet(ContextMenuKind.ROOT_PROJECT, rootProjectActionSet);
