X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/5b2cd67083705b616e5d468e8ad2c10d84db2af7..41f6f1e495c82fcfa79b87cf718fa2e9cd91c726:/src/views-components/data-explorer/renderers.test.tsx

diff --git a/src/views-components/data-explorer/renderers.test.tsx b/src/views-components/data-explorer/renderers.test.tsx
index 5f752b6bb8..f0efdf7432 100644
--- a/src/views-components/data-explorer/renderers.test.tsx
+++ b/src/views-components/data-explorer/renderers.test.tsx
@@ -2,10 +2,10 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { mount, configure } from 'enzyme';
 import { ResourceFileSize } from './renderers';
-import * as Adapter from "enzyme-adapter-react-16";
+import Adapter from "enzyme-adapter-react-16";
 import { Provider } from 'react-redux';
 import configureMockStore from 'redux-mock-store'
 import { ResourceKind } from '../../models/resource';
@@ -55,7 +55,7 @@ describe('renderers', () => {
             // then
             expect(wrapper.text()).toContain('0 B');
         });
-        
+
         it('should render empty string for non collection resource', () => {
             // given
             const store1 = mockStore({ resources: {
