X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/59fc59f324194f2762dae92cf94bd4a05e33cb09..34399d176adae18bd42d70129c0a51f740afeb8e:/src/views-components/sharing-dialog/visibility-level-select.tsx

diff --git a/src/views-components/sharing-dialog/visibility-level-select.tsx b/src/views-components/sharing-dialog/visibility-level-select.tsx
index f03b5e99a7..7213155164 100644
--- a/src/views-components/sharing-dialog/visibility-level-select.tsx
+++ b/src/views-components/sharing-dialog/visibility-level-select.tsx
@@ -20,7 +20,6 @@ const VisibilityLevelSelectStyles: StyleRulesCallback<VisibilityLevelSelectClass
         marginLeft: theme.spacing.unit,
     }
 });
-
 export const VisibilityLevelSelect = withStyles(VisibilityLevelSelectStyles)(
     ({ classes, ...props }: SelectProps & WithStyles<VisibilityLevelSelectClasses>) =>
         <Select
