X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/59ad75d2aca135adeb1aadc9847653e5c273ccc1..792b37dffef102105fa902888cb948da43b892b4:/src/views-components/sharing-dialog/sharing-public-access-form-component.tsx

diff --git a/src/views-components/sharing-dialog/sharing-public-access-form-component.tsx b/src/views-components/sharing-dialog/sharing-public-access-form-component.tsx
index 7f3c4b7b4f..03e9413e83 100644
--- a/src/views-components/sharing-dialog/sharing-public-access-form-component.tsx
+++ b/src/views-components/sharing-dialog/sharing-public-access-form-component.tsx
@@ -22,7 +22,7 @@ const SharingPublicAccessForm = withStyles(sharingPublicAccessStyles)(
             <Divider />
             <Grid container alignItems='center' spacing={8} className={classes.root}>
                 <Grid item xs={8}>
-                    <Typography variant='subheading'>
+                    <Typography variant='subtitle1'>
                         {renderVisibilityInfo(visibility)}
                     </Typography>
                 </Grid>
